#配置 feign 默认请求时间仅几秒钟，配置请求时间长一些(毫秒)
feign:
  client:
    config:
      default:
        connectTimeout: 600000
        readTimeout: 600000
    default-to-properties: false
  hystrix:
    enabled: false    # 不要开启hystrix，会导致超时配置不生效


-- 20240906
-- base.RASTER_DSM_BP_3857

DELETE FROM base.t_table_filed WHERE id='069ce7308f20449ca6997ed7ca64a98c';
DELETE FROM base.t_table_filed WHERE id='5c4925d6043a4f2087f8d67edf0c62da';
INSERT INTO base.t_table_filed(id, filed_name, filed_zh, filed_describe, filed_type, filed_type_len, filed_dict, create_time, delete_time, create_user_id, delete_user_id)
VALUES('069ce7308f20449ca6997ed7ca64a98c', 'id', '唯一标志', NULL, 'varchar', '128', NULL, '2024-07-05 13:26:05.000', NULL, '1', NULL);
INSERT INTO base.t_table_filed(id, filed_name, filed_zh, filed_describe, filed_type, filed_type_len, filed_dict, create_time, delete_time, create_user_id, delete_user_id)
VALUES('5c4925d6043a4f2087f8d67edf0c62da', 'geom', '空间信息', NULL, 'geometry', NULL, NULL, '2024-07-05 13:26:05.000', NULL, '1', NULL);